Nomination Form for the

Best Paper of the

1995 American Control Conference

At each American Control Conference, theAmerican Automatic Control Council presents an award

for the best paper given at the previous year’s conference. The award is named for O. Hugo Schuck, a

pioneer in the practice of flight control design at Honeywell, Inc., and later at NASA. This award was

established with the purpose not only of recognizing technical contributions but for the manner and

effectiveness with which they are communicated to the controls community.

The paper must have been presented by the author or a co-author at the conference. Selection

criteria include quality of the written and oral presentation, technical contribution, timeliness, and

practicality.

If you would like tonominate one of this year’s papers, please provide the following information:

Title of Paper: ________________________________________________________

_____________________________________________________________________

Authors: ______________________________________________________________

ACC Session: ______________ Proceedings Page Numbers: __________________

Reasons that the paper should be considered: _______________________________

_____________________________________________________________________

_____________________________________________________________________

Nominator’s Name: ____________________________________________________

Nominator’s Address: __________________________________________________

Nominator’s Telephone Number/fax/e-mail: ________________________________

__________________________________________________________________________________

Please return this form to the ACC Information Desk at the Meeting or mail by

December 1, 1995 to:

Professor Abraham Haddad

Department of EECS

Northwestern University

2145 Sheridan Rd.

Evanston, IL 60208-3118.